<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% Pierre A. MacKay, Dept. of Classics, University of Washington
% mackay@cs.washington.edu
% Walter Schmidt 
% w.a.schmidt@gmx.net
% ------------------------
% 2004-10-18 added proper identification (\ProvidesPackage)
% 2003-05-28 patched wrt/ T1 encoding, added \textgreek
% 12/7/97  Convert to ibycus4
% 4/12/95  Test for isolatin package and suppress ibycus3.map if it's there
% 31/10/95 Added \input{iby3extr} for editor symbols
% 25/1/95  Created.
%
% For use with LaTeX2e
% Replaces iby4text.tex; does not call setiby4.tex
% Use "\fontsize{14}{17pt}\selectfont" instead of "\setgreek14/17"
% and "{\greek{}...}" instead of "\GK{}...\RM{}"
% The fd file is named as it should be, for ``Unknown'' encoding
% even though I have to use OT1 in the actual file

\ProvidesPackage{ibycus4}[2004/10/18 v4.5 Ibycus4 (P.A.MacKay/WaS)]
\newtoks\digraphs
\digraphs={tlgsqq}
\chardef \atcode = \the \catcode `\@
\def\unletterat{\catcode`\@ = \the \atcode}
\catcode`\@ = 11
\ifx\@grave@A@grave@\undefined\input{ibycus4.map}
\else\@latex@warning@no@line{%
No GreekKeys upper ASCII. Post-positive ASCII sequences only}\fi
% Don't use the GreekKeys equivalents if isolatin is in use.
\unletterat
\input{Uibycus4.fd}
\def\greek{\fontencoding{OT1}\fontfamily{ibycus}\selectfont}
\input{iby4extr}
\DeclareTextFontCommand{\textgreek}{\greek}

\endinput
</pre></body></html>